1 UV_ROBUST Reweight a UV table
        UV_ROBUST

    Re‐weight a UV table in the same way as UV_MAP.

2 UVDATA$
        TASK\CHARACTER "Input UVDATA table" UVDATA$

    Input UV file name.  Default extension is .UVT

2 UVSORT$
        TASK\CHARACTER "Output reweighted table" UVSORT$

    Output UV file name.  Default extension is .UVT

2 CELL$
        TASK\REAL "UV uniform Cell size" CELL$

2 ROBUST$ ;ti +4 TASK\REAL "Robust parameter" ROBUST$

2 WCOL$ ;ti +4 TASK\INTEGER "Weight column" WCOl$

1 ENDOFHELP











































