1 UV_PROPER_MOTION  Apply proper motion to a UV tqble
        UV_PROPER_MOTION

    Apply  proper  motions to a UV data set to bring them to the same common
    date. This common date is that of the Equinox specified  in  the  Source
    Position information, usually J2000.0

2 UV_INPUT$
        TASK\CHARACTER "Input UV table"       UV_INPUT$

    Input UV table name.

2 UV_OUTPUT$
        TASK\CHARACTER "Output UV table"      UV_OUTPUT$

    Output UV table name.


2 PROPER$
        TASK\REAL      "Proper motions (in mas/year)" PROPER$[2]

    Proper  motions  mulpha.cos(RA) and muelta, expressed in milliarcsec per
    year. These are the usual proper motions from  catalogs,  local  to  the
    source.

1 ENDOFHELP








































