1 UV_NOISE Recompute visibility weights based on the visibility RMS outside the line
        UV_NOISE

    UV_NOISE  computes for each UV distance the RMS of the visibilities out‐
    side the line. UV_NOISE then stores the corresponding  weight  into  the
    input table.

2 UVDATA$
        TASK\CHARACTER "UV table" UVDATA$

    Input and output UV table.

2 CHANNELS$
        TASK\INTEGER    "First  and  last  channels  associated to the line"
    CHANNELS$[2]

2 PRINT$
        TASK\LOGICAL   "Print modifications" PRINT$

    Logical switch to print the results on screen  in  addition  to  storing
    them  into  the  UV  table. Printed informations are: Visibility number,
    RMS, weight, RMS/weight, number of channel used to compute the RMS.

1 ENDOFHELP










































