1 UV_MODEL
        UV_MODEL

    Compute a UV table from an input image (3‐D data cube are allowed) and a
    reference UV table used to specify the UV sampling.

    Related task UV_TABLE will do the same for  a  regular  output  UV  grid
    rather than on the sampling of a template table.

2 UVSAMPLE$
        TASK\FILE "Input UV Sample Table" UVSAMPLE$

    UV  table used to define the UV plane sampling. U, V, date, time, anten‐
    nas and weights are copied from this table to the model one. This  table
    could be produced using the ASTRO\UV command.

2 IMAGE$
        TASK\FILE "Input .VLM Cube" IMAGE$

    Image  from  which  the model UV table must be computed. It should be in
    the order Velocity, RA, Dec.

2 UVMODEL$
        TASK\FILE "Output UV Model Table" UVMODEL$

    Output UV table, i.e. the Fourier transform of the IMAGE$ sampled on the
    coordinates specified in the sample UV table UVSAMPLE$ .

1 END





































