1 UV_MFLAG Flag visibilities too far from a source model

        Flag the data if the REAL part of the visibility is greater than and
    lower than 2 thresholds = (1+/‐TOLER)*model.  Data are  flagged  setting
    weights to 0.

2 UV_TABLE$
        TASK\CHARACTER "UV table to be flaggeded" UV_TABLE$


    UV table to be flagged
2 SELF$
        TASK\CHARACTER "UV table used as reference" SELF$


    source reference UV table

2 UVMODEL$
        TASK\CHARACTER "UV Model " UVMODEL$

    The source model UV table

2 TOLER$
        TASK\REAL    "Flag Tolerance  versus the model (%)" TOLER$

    Data are  flagged above the tolerance level (in percent of the model)


2 DTIME$
        TASK\REAL"The smoothing time constant in seconds" DTIME$

    Integration time to derive correction.
2 WCOL$
        TASK\INTEGER "The reference channel" WCOL$

    If  the  reference  SELF$   is   a  spectral  line  UV  table,  spectral
    channel to be used.

2 SUB$
        TASK\REAL "Fraction of the continuum source to subtract" SUB$

    Typically 1 or 0, to remove or not the continuum model.
1 ENDOFHELP























