1 UV_MERGE Merge two UV table with the same spectral characteristics
        UV_MERGE

    This task merges together two tables of UV data, to form a single output
    table.  The two input tables must have the same spectral characteristics
    (not checked). This task is to be used e.g. when merging the UV data ob‐
    served with an interferometer (PdBI) and the short spacings derived from
    a single‐dish (30m ‐‐ see the UV_SINGLE task).

    Multiplicative  factors  may  be  applied  to both  the  amplitudes  and
    weights of one of the table.

2 TABLE1_IN$
        TASK\CHARACTER "First input UV Table" TABLE1_IN$

    This the name of the first input table (.UVT extension by default).

    ti ‐4 2 WEIGHT$
        TASK\REAL "Weight multiplicative factor" WEIGHT$

    This is the multiplicative  correction  factor  to  be  applied  to  the
    weights of the first table.

2 FACTOR$
        TASK\REAL "Data multiplicative factor" FACTOR$

    This is the multiplicative correction factor to be applied to the ampli‐
    tude of the first table.

2 TABLE2_IN$
        TASK\CHARACTER "Second input UV Table (reference)" TABLE2_IN$

    This the name of the second input table (.UVT extension by default)

2 TABLE_OUT$
        TASK\CHARACTER "Output merged UV Table" TABLE_OUT$

    This the name of the output table (.UVT extension by default)

1 ENDOFHELP


























