1 UV_CUTS Output radial visibility profiles from an input UV table
        UV_CUTS

    Compute  radial  visibility profiles averaged on regularly sampled angle
    intervals around the UV plane center.  The results is output  in  a  4‐D
    GDF file ordered as:

      ‐ Axis 1: Radial points;
      ‐ Axis 2: Azimuth angles;
      ‐ Axis 3: Frequency channels;
      ‐ Axis 4: Amplitude, phase and weight.

    This task may be used to check circularity on a source which is centered
    on the phase reference.

2 UVTABLE$
        TASK\CHARACTER "Input UV table" UVTABLE$

2 OUTIMAGE$
        TASK\CHARACTER "Output 4‐D GDF file" OUTIMAGE$

2 QMIN$
        TASK\REAL "Minimum radius [m]" QMIN$

2 QMAX$
        TASK\REAL "Maximum radius [m]" QMAX$

2 QSTEP$
        TASK\REAL "Radius interval [m]" QSTEP$

2 TMIN$
        TASK\REAL "Minimum angle [radian]" TMIN$

2 TMAX$
        TASK\REAL "Maximum angle [radian]" TMAX$

2 TSTEP$
        TASK\REAL "Angle interval [radian]" TSTEP$

1 ENDOFHELP


























