1 UV_CIRCLE Compute the azimuthal average of an input UV table
        UV_CIRCLE

    Compute  the  azimuthal  average of the visibilities around the UV plane
    center. The output UV table gives visibilities  as  a  function  of  the
    sqrt(U^2+V^2).  If no input visibility is found inside an averaging cir‐
    cle, then this radius is skipped in the output table.

2 UVTABLE$
        TASK\CHARACTER "Input UV table" UVTABLE$

2 OUTABLE$
        TASK\CHARACTER "Output UV table" OUTABLE$

2 QMIN$
        TASK\REAL "Minimum radius [m]" QMIN$

2 QMAX$
        TASK\REAL "Maximum radius [m]" QMAX$

    Maximum UV radius is computed from the input visibilities when QMAX$  is
    set to 0.

2 QSTEP$
        TASK\REAL "Radius interval [m]" QSTEP$

    Radius interval between two consecutive averaging ring.

1 ENDOFHELP





































