1 UV_CAL Apply an input table of gain (from UV_GAIN) to a table of uncalibrated visibilities
        UV_CAL

    UV_CAL  applies  phase  and/or amplitude calibration gains to a table of
    uncalibrated visibilities. The gains are read from a  table  in  general
    produce  by  the  UV_GAIN task. This task enables phase and/or amplitude
    referencing from continuum to line or from one simple source (i.e. easi‐
    ly self‐calibrated) to a complex one.

2 UVDATA$
        TASK\CHARACTER  "UV data table"         UVDATA$

    Input  UV  table to be calibrated by reference. This table can be a con‐
    tinuum or line table.

2 UVGAIN$
        TASK\CHARACTER  "UV gain table"         UVGAIN$

    Input table of gain which will be applied to UVDATA$. The gains of  this
    table are assumed to be valid for all the channels of the UVDATA$ table.
    This means that the bandpass calibration of the UVDATA$ is assumed to be
    correct.

2 UVCAL$
        TASK\CHARACTER  "UV calibrated table"   UVCAL$

    Output UV table of calibrated visibilities.

2 DO_AMPLI$
        TASK\LOGICAL    "Calibrate amplitudes"  DO_AMPLI$

    Logical switch to apply only the modulus of the gains.

2 DO_PHASE$
        TASK\LOGICAL    "Calibrate phases"      DO_PHASE$

    Logical switch to apply only the phase of the gains.

1 ENDOFHELP



























