1 UV_AVERAGE Channel averaging of UV data

        Averages  velocity  channels  of  a   UV   data   set to  produce  a
    pseudo continuum (single‐channel)  output  UV table. To  smooth  the  UV
    data  but  still get several output channels, use UV_COMPRESS or UV_HAN‐
    NING.

2 UV_INPUT$
        TASK\CHARACTER "Input UV table"       UV_INPUT$

    Input UV file name.
2 UV_OUTPUT$
        TASK\CHARACTER "Output UV table"      UV_OUTPUT$

    Output UV file name.
2 CHANNEL$
        TASK\INTEGER "First and last channel (sequence)" UV_CHANNELS$

    Sequence of first and last input channels to be averaged to produce  the
    output channel e.g. 10 13 40 56 averages channels 10 to 13 and 40 to 56
1 ENDOFHELP













































