1 UVT_CONVERT [IN_FILE] [OUT_FILE]

  Convert from UVDAT to UVFIL data format when needed. The difference
  between those two UV data formats being the meanings of the weights. In
  the new format, the weights enable a direct estimate of the
  noise. IN_FILE and OUT_FILE must be supplied without extension.

1 ENDOFHELP
