MAPPING Window Interface

  This detached menu controls some of the basic functions of the MAPPING
  program, including basic SIC/GREG commands and a few "general"
  procedures.

SIC Menu
--------
  This menu controls some SIC commands.

Window Menu
-----------
  This menu controls basic GREG commands.

GREG Menu
---------
  This menu activates control panels for high level command
  procedures used for displaying, header editing etc...

MAPPING Menu
------------
  This menu activates control panels for high level command
  procedures used for uv-visibility analysis, imaging and deconvolution.
