GREG Window Interface

  This detached menu controls some of the basic functions
  of the GREG program, including basic SIC/GREG commands and
  a few "general" procedures

SIC Menu

  This menu controls some SIC commands.

Window Menu

  This menu controls basic GREG commands.

GREG Menu

  This menu activates control panels for high level command
  procedures used for displaying, header editing etc...
