1 GO
    GO [Action]

        Activates some external program whose parameters have been
    defined by INPUT command. If no Action is specified, the last
    Action defined by INPUT is used. Action may be one among those
    listed by INPUT, or any GILDAS Task. In such a case, GO will
    run the task after editing the parameters.

        See HELP INPUT for a list of recognized actions.

1 ENDOFHELP
